From a169a8e882fc89154a3b1496a3f033bffaf62665 Mon Sep 17 00:00:00 2001
From: enahum <nahumhbl@gmail.com>
Date: Mon, 2 May 2016 18:15:08 -0300
Subject: PLT-1915: Fix Timestamps are displayed as 12 hour even when set to 24
 hour mode (#2852)

---
 webapp/components/time_since.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'webapp/components/time_since.jsx')

diff --git a/webapp/components/time_since.jsx b/webapp/components/time_since.jsx
index 9f7a93ceb..f715193e2 100644
--- a/webapp/components/time_since.jsx
+++ b/webapp/components/time_since.jsx
@@ -41,7 +41,7 @@ export default class TimeSince extends React.Component {
                     month='long'
                     day='numeric'
                     year='numeric'
-                    hour12={true}
+                    hour12={!Utils.isMilitaryTime()}
                     hour='numeric'
                     minute='2-digit'
                 />
-- 
cgit v1.2.3-1-g7c22

