From 45ca052482d42a535f399b149c7e26e99663ac15 Mon Sep 17 00:00:00 2001
From: enahum <nahumhbl@gmail.com>
Date: Wed, 28 Sep 2016 09:48:19 -0300
Subject: PLT-4298 Remove "Return to ongoing call" (#4101)

---
 webapp/components/admin_console/rate_settings.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'webapp/components/admin_console/rate_settings.jsx')

diff --git a/webapp/components/admin_console/rate_settings.jsx b/webapp/components/admin_console/rate_settings.jsx
index bb4f9d83c..8159f4b0d 100644
--- a/webapp/components/admin_console/rate_settings.jsx
+++ b/webapp/components/admin_console/rate_settings.jsx
@@ -112,7 +112,7 @@ export default class RateSettings extends AdminSettings {
                     helpText={
                         <FormattedMessage
                             id='admin.rate.maxBurstDescription'
-                            defaultMessage='Maxumum number of requests allowed beyond the per second query limit.'
+                            defaultMessage='Maximum number of requests allowed beyond the per second query limit.'
                         />
                     }
                     value={this.state.maxBurst}
-- 
cgit v1.2.3-1-g7c22

