From c6fb95912bb481791c1ca370a46a4da9c05d05ad Mon Sep 17 00:00:00 2001
From: Christopher Speller <crspeller@gmail.com>
Date: Wed, 8 Jul 2015 11:50:10 -0400
Subject: Changing the way we mattermost handles URLs. team.domain.com becomes
 domain.com/team. Renaming team.Name to team.DisplayName and team.Domain to
 team.Name. So: team.Name -> url safe name. team.DisplayName -> nice name for
 users

---
 web/react/pages/login.jsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'web/react/pages/login.jsx')

diff --git a/web/react/pages/login.jsx b/web/react/pages/login.jsx
index a4e6b438e..8348f0b5d 100644
--- a/web/react/pages/login.jsx
+++ b/web/react/pages/login.jsx
@@ -3,9 +3,9 @@
 
 var Login = require('../components/login.jsx');
 
-global.window.setup_login_page = function() {
+global.window.setup_login_page = function(teamDisplayName, teamName) {
     React.render(
-        <Login />,
+        <Login teamDisplayName={teamDisplayName} teamName={teamName}/>,
         document.getElementById('login')
     );
 };
-- 
cgit v1.2.3-1-g7c22

