From 48eac58eaacba075f3b7ef518d0312b5f7ab3c17 Mon Sep 17 00:00:00 2001
From: hmhealey <harrisonmhealey@gmail.com>
Date: Wed, 2 Mar 2016 17:11:51 -0500
Subject: Fixed warnings and removed injectIntl from System Console user list

---
 web/react/components/team_members_dropdown.jsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'web/react/components/team_members_dropdown.jsx')

diff --git a/web/react/components/team_members_dropdown.jsx b/web/react/components/team_members_dropdown.jsx
index 7a298d26a..8aacba8ca 100644
--- a/web/react/components/team_members_dropdown.jsx
+++ b/web/react/components/team_members_dropdown.jsx
@@ -263,6 +263,7 @@ export default class TeamMembersDropdown extends React.Component {
                     defaultMessage='Confirm demotion from System Admin role'
                 />
             );
+
             const message = (
                 <div>
                     <FormattedMessage
-- 
cgit v1.2.3-1-g7c22

